    Modify Mail Exchanger Host

    This window contains the following fields:

    DNS Server

    This read-only field specifies the DNS Server for this mail
    exchanger. 

    Domain Name

    This read-only field specifies the Internet domain name for this
    mail exchanger. 

    Hostnames

    Use this field to specify which host machine(s) will act as mail
    host, or mail dispatcher, for the machines in the Domain Name field.
    Leave a blank space between host names for multiple entries.

    Priority

    You can use this field to associate a priority, or preference, to
    using this hostname as a mail host. The number can range from 0 to
    65536 inclusive. The lower the number the higher the priority. You
    can also use the counter buttons to increment or decrement this
    number.

    This window contains the following buttons:

    Modify

    Click on this button to save the current information as a mail
    exchanger for the Internet domain set in the Domain Name field.

    Clear Fields

    Click on this button to clear the existing choices in all fields.

    Next

    Use this button to move to the next selected mail exchanger from the
    list of mail exchangers.

    Cancel

    Click on this button to close the window without making any changes.

